-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.174458899754
cusum  =  0.129201296792
eta  =  0.618828245641
hl_amp_ratio  =  0.630356445009
kurtosis  =  -0.898413617046
n_points  =  385
period  =  0.617720330578
period_SNR  =  43.4203220752
period_log10FAP  =  -45.5685191358
period_uncertainty  =  0.000130900690468
phase_cusum  =  0.268903812419
phase_eta  =  0.518343545565
phi21  =  1.21442528247
phi31  =  2.86858197539
quartile31  =  0.28
r21  =  0.412896039001
r31  =  0.244563066311
shapiro_w  =  0.955568015575
skewness  =  -0.290494276434
slope_per10  =  -0.101380496994
slope_per90  =  0.14626260335
stetson_k  =  0.850805148417
weighted_mean  =  12.8390381282
weighted_std  =  0.156850590473
