-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.230286726604
cusum  =  0.134276540837
eta  =  0.620213031727
hl_amp_ratio  =  0.299080829038
kurtosis  =  -0.926894596744
n_points  =  283
period  =  0.552233623675
period_SNR  =  33.2685291837
period_log10FAP  =  -34.7817604306
period_uncertainty  =  0.000113808970729
phase_cusum  =  0.246979723223
phase_eta  =  0.50470379487
phi21  =  -2.0375743856
phi31  =  -3.78216690583
quartile31  =  0.335
r21  =  0.300041789958
r31  =  0.223452782271
shapiro_w  =  0.876894652843
skewness  =  -0.670594372311
slope_per10  =  -0.146857063487
slope_per90  =  0.25799999712
stetson_k  =  0.765399929618
weighted_mean  =  15.0039831482
weighted_std  =  0.218321687472
