-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.357927685104
cusum  =  0.158115324859
eta  =  0.68956381701
hl_amp_ratio  =  0.515413538612
kurtosis  =  -0.76996115079
n_points  =  326
period  =  0.77908063422
period_SNR  =  46.8331147358
period_log10FAP  =  -41.5438334267
period_uncertainty  =  0.000309759970533
phase_cusum  =  0.247427148455
phase_eta  =  0.219120600096
phi21  =  1.21136100489
phi31  =  -0.104751506119
quartile31  =  0.45
r21  =  0.402235390244
r31  =  0.14855883532
shapiro_w  =  0.93572217226
skewness  =  -0.529127438258
slope_per10  =  -0.142914452658
slope_per90  =  0.273269938159
stetson_k  =  0.783081939864
weighted_mean  =  11.9931687635
weighted_std  =  0.28582475591
