-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.293723878668
cusum  =  0.130051649567
eta  =  0.464846213943
hl_amp_ratio  =  0.41044103412
kurtosis  =  -0.980502069657
n_points  =  372
period  =  0.688327608224
period_SNR  =  47.0296717833
period_log10FAP  =  -53.5727432998
period_uncertainty  =  0.000154391246995
phase_cusum  =  0.28059348207
phase_eta  =  0.0772589605547
phi21  =  -2.02355028494
phi31  =  -3.98417115752
quartile31  =  0.43
r21  =  0.480494351609
r31  =  0.306605802675
shapiro_w  =  0.915669023991
skewness  =  -0.550065053076
slope_per10  =  -0.165102623517
slope_per90  =  0.305434862639
stetson_k  =  0.785536147897
weighted_mean  =  15.288060505
weighted_std  =  0.263132873433
