-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.159931253848
cusum  =  0.0749210194063
eta  =  0.718312390572
hl_amp_ratio  =  0.757477555508
kurtosis  =  0.0621051340161
n_points  =  370
period  =  0.397598003023
period_SNR  =  37.2040450346
period_log10FAP  =  -37.6618858274
period_uncertainty  =  5.15134540744e-05
phase_cusum  =  0.227960497308
phase_eta  =  0.790529894478
phi21  =  -1.95343134554
phi31  =  -1.65016228196
quartile31  =  0.18
r21  =  0.208878550798
r31  =  0.181729244772
shapiro_w  =  0.972344875336
skewness  =  -0.539626846409
slope_per10  =  -0.0712152822811
slope_per90  =  0.0656769647353
stetson_k  =  0.771514908154
weighted_mean  =  15.6735952529
weighted_std  =  0.145802690207
