-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.76


######### Lightcurve features #########

amplitude  =  0.0704572368443
cusum  =  0.353701111507
eta  =  0.388106556729
hl_amp_ratio  =  3.6964532554
kurtosis  =  0.435798995214
n_points  =  386
period  =  0.997298775851
period_SNR  =  45.2742015342
period_log10FAP  =  -37.9913668947
period_uncertainty  =  0.000332654732091
phase_cusum  =  0.212951998498
phase_eta  =  0.631038526966
phi21  =  -4.34349551095
phi31  =  -4.63955563724
quartile31  =  0.03
r21  =  0.48803852214
r31  =  0.329489682998
shapiro_w  =  0.855477631092
skewness  =  1.03531504839
slope_per10  =  -0.245784254708
slope_per90  =  0.198573730936
stetson_k  =  0.670631752407
weighted_mean  =  13.8109715773
weighted_std  =  0.028279914882
