-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.296309586903
cusum  =  0.104933320431
eta  =  0.546601576819
hl_amp_ratio  =  0.427625207944
kurtosis  =  -0.368140660962
n_points  =  385
period  =  0.653911583437
period_SNR  =  41.5470631494
period_log10FAP  =  -43.4288188125
period_uncertainty  =  0.000119187737732
phase_cusum  =  0.23336764839
phase_eta  =  0.360625319465
phi21  =  4.19311007411
phi31  =  5.54289864195
quartile31  =  0.34
r21  =  0.464993875696
r31  =  0.210538383814
shapiro_w  =  0.922877192497
skewness  =  -0.771976766712
slope_per10  =  -0.0877712739721
slope_per90  =  0.161266665285
stetson_k  =  0.71862936429
weighted_mean  =  14.4733629538
weighted_std  =  0.250343385083
