-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.207481296065
cusum  =  0.152161320428
eta  =  0.62076471804
hl_amp_ratio  =  0.647881199286
kurtosis  =  -0.122408002006
n_points  =  298
period  =  0.559836798777
period_SNR  =  33.1505391995
period_log10FAP  =  -28.1801072494
period_uncertainty  =  0.000104812184764
phase_cusum  =  0.230055849205
phase_eta  =  0.604546910785
phi21  =  1.10862227134
phi31  =  1.77927412321
quartile31  =  0.3075
r21  =  0.456127732565
r31  =  0.154631756279
shapiro_w  =  0.967219769955
skewness  =  -0.567321856106
slope_per10  =  -0.142261061166
slope_per90  =  0.135751163234
stetson_k  =  0.787100882539
weighted_mean  =  13.8888837288
weighted_std  =  0.210387197329
