-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.230852822281
cusum  =  0.193761054298
eta  =  0.622269597158
hl_amp_ratio  =  0.764575254841
kurtosis  =  -0.553793411825
n_points  =  143
period  =  0.590776569939
period_SNR  =  16.6879259282
period_log10FAP  =  -13.874127573
period_uncertainty  =  0.000111618914409
phase_cusum  =  0.332228175432
phase_eta  =  0.330213767673
phi21  =  0.918335507184
phi31  =  2.58135856689
quartile31  =  0.23
r21  =  0.385729772633
r31  =  0.206081376845
shapiro_w  =  0.966733813286
skewness  =  -0.408832753316
slope_per10  =  -0.256622502449
slope_per90  =  0.57520000264
stetson_k  =  0.808043103499
weighted_mean  =  14.0887820445
weighted_std  =  0.179457285135
