-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.73


######### Lightcurve features #########

amplitude  =  0.243318751029
cusum  =  0.162127973236
eta  =  0.684806441887
hl_amp_ratio  =  0.535954931444
kurtosis  =  -0.043646084239
n_points  =  147
period  =  0.143022380674
period_SNR  =  12.6922922806
period_log10FAP  =  -9.41384219184
period_uncertainty  =  9.15736744536e-06
phase_cusum  =  0.242173873581
phase_eta  =  1.28588092349
phi21  =  3.18982916801
phi31  =  1.83999075786
quartile31  =  0.325
r21  =  0.0786007643565
r31  =  0.21366762943
shapiro_w  =  0.942738592625
skewness  =  -0.0224318789093
slope_per10  =  -0.0387636308654
slope_per90  =  0.0207174751694
stetson_k  =  0.737568467436
weighted_mean  =  14.1713898145
weighted_std  =  0.230923660556
