-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.301538940231
cusum  =  0.108993279679
eta  =  0.598421120225
hl_amp_ratio  =  0.573742456532
kurtosis  =  -0.600840442848
n_points  =  381
period  =  0.567455138304
period_SNR  =  42.8030597343
period_log10FAP  =  -47.7123285934
period_uncertainty  =  0.000103948554194
phase_cusum  =  0.233965816481
phase_eta  =  0.175028687887
phi21  =  4.06350392314
phi31  =  5.16378551642
quartile31  =  0.42
r21  =  0.478054579278
r31  =  0.322866045156
shapiro_w  =  0.935329914093
skewness  =  -0.611815669136
slope_per10  =  -0.131039695822
slope_per90  =  0.165578008885
stetson_k  =  0.818926404571
weighted_mean  =  15.0577717652
weighted_std  =  0.264743766862
