-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.48


######### Lightcurve features #########

amplitude  =  0.273545203051
cusum  =  0.216476451281
eta  =  0.832513159775
hl_amp_ratio  =  1.17249247825
kurtosis  =  6.59531195161
n_points  =  114
period  =  0.11137501389
period_SNR  =  11.5471701757
period_log10FAP  =  -5.94993908009
period_uncertainty  =  5.55367644119e-06
phase_cusum  =  0.248343473769
phase_eta  =  1.4136035038
phi21  =  1.68369163455
phi31  =  1.61921341411
quartile31  =  0.36
r21  =  0.0851919208429
r31  =  0.0522318223885
shapiro_w  =  0.820347845554
skewness  =  1.92626992369
slope_per10  =  -0.0195436242697
slope_per90  =  0.0358342443648
stetson_k  =  0.745773419735
weighted_mean  =  14.7803742802
weighted_std  =  0.277385346094
