-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.225453990604
cusum  =  0.151531970836
eta  =  0.486555083258
hl_amp_ratio  =  0.60643549915
kurtosis  =  -1.28829155101
n_points  =  390
period  =  0.736695992751
period_SNR  =  44.9527309211
period_log10FAP  =  -52.2278077979
period_uncertainty  =  0.000145098877371
phase_cusum  =  0.25846113069
phase_eta  =  0.150117206853
phi21  =  1.27517832523
phi31  =  -0.202920811203
quartile31  =  0.38
r21  =  0.491950551373
r31  =  0.248983730181
shapiro_w  =  0.924851298332
skewness  =  -0.265338909517
slope_per10  =  -0.185217960531
slope_per90  =  0.339132199202
stetson_k  =  0.848977321185
weighted_mean  =  13.824556419
weighted_std  =  0.20944697673
