-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.233255818535
cusum  =  0.144829660232
eta  =  0.474539399764
hl_amp_ratio  =  0.666136275621
kurtosis  =  -1.19608467172
n_points  =  377
period  =  0.709981217424
period_SNR  =  51.1211275937
period_log10FAP  =  -56.1032552631
period_uncertainty  =  0.000135658293012
phase_cusum  =  0.276017952408
phase_eta  =  0.128266325749
phi21  =  -2.11750489353
phi31  =  -0.641120352123
quartile31  =  0.33
r21  =  0.395856906511
r31  =  0.249154844504
shapiro_w  =  0.942849636078
skewness  =  -0.22195332102
slope_per10  =  -0.184067059193
slope_per90  =  0.258398619224
stetson_k  =  0.848396407472
weighted_mean  =  14.3433684958
weighted_std  =  0.189320221843
