-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.235383838427
cusum  =  0.161528297731
eta  =  0.513173734925
hl_amp_ratio  =  0.888586907886
kurtosis  =  -1.14370920283
n_points  =  332
period  =  0.620624640016
period_SNR  =  41.2484571296
period_log10FAP  =  -45.8758329901
period_uncertainty  =  0.000124465137705
phase_cusum  =  0.307340964951
phase_eta  =  0.0365650149813
phi21  =  4.07078537628
phi31  =  5.30963951044
quartile31  =  0.37
r21  =  0.470819524791
r31  =  0.354298349864
shapiro_w  =  0.937163412571
skewness  =  -0.307245875597
slope_per10  =  -0.22114389692
slope_per90  =  0.481073200991
stetson_k  =  0.85025341513
weighted_mean  =  14.1988328729
weighted_std  =  0.207458055994
