-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.197845559478
cusum  =  0.141350541919
eta  =  0.591091931973
hl_amp_ratio  =  0.471280857191
kurtosis  =  -1.03540659651
n_points  =  406
period  =  0.678852565583
period_SNR  =  47.9191126255
period_log10FAP  =  -53.1214489281
period_uncertainty  =  0.00012402305381
phase_cusum  =  0.261730142004
phase_eta  =  0.490157268654
phi21  =  0.90971305257
phi31  =  2.3907487557
quartile31  =  0.31
r21  =  0.332748559554
r31  =  0.127212389181
shapiro_w  =  0.911861002445
skewness  =  -0.523803435731
slope_per10  =  -0.145267399206
slope_per90  =  0.304147254749
stetson_k  =  0.81466253566
weighted_mean  =  14.1140153722
weighted_std  =  0.179062221736
