-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.20499521376
cusum  =  0.110880481854
eta  =  0.618700824199
hl_amp_ratio  =  0.438910371393
kurtosis  =  -0.391060615515
n_points  =  388
period  =  0.627405453509
period_SNR  =  49.7491555745
period_log10FAP  =  -53.6898357849
period_uncertainty  =  0.00010515645455
phase_cusum  =  0.212041981478
phase_eta  =  0.30503307728
phi21  =  -2.36117808949
phi31  =  -1.352835795
quartile31  =  0.29
r21  =  0.328068089607
r31  =  0.28436571839
shapiro_w  =  0.927857041359
skewness  =  -0.720675014669
slope_per10  =  -0.116905805012
slope_per90  =  0.125329266385
stetson_k  =  0.767364923549
weighted_mean  =  16.616925923
weighted_std  =  0.183891170061
