-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.370441157418
cusum  =  0.0959281186925
eta  =  0.449915784908
hl_amp_ratio  =  0.269782024162
kurtosis  =  -0.865728274473
n_points  =  293
period  =  0.586773100114
period_SNR  =  35.3086396139
period_log10FAP  =  -39.1404702101
period_uncertainty  =  0.000111257702163
phase_cusum  =  0.235218038102
phase_eta  =  0.0277611319782
phi21  =  0.811890356814
phi31  =  1.88993648844
quartile31  =  0.46
r21  =  0.496026004285
r31  =  0.301785487081
shapiro_w  =  0.88278734684
skewness  =  -0.690267233108
slope_per10  =  -0.152211986255
slope_per90  =  0.286701670263
stetson_k  =  0.736409248947
weighted_mean  =  14.8848195481
weighted_std  =  0.322729290732
