-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.267115227735
cusum  =  0.150105843635
eta  =  0.556105886817
hl_amp_ratio  =  0.392615779906
kurtosis  =  -0.863770836567
n_points  =  266
period  =  0.656765687246
period_SNR  =  35.6878953111
period_log10FAP  =  -37.1953646426
period_uncertainty  =  0.000145699707751
phase_cusum  =  0.242306187406
phase_eta  =  0.0824181678538
phi21  =  1.02505345284
phi31  =  -0.920553514358
quartile31  =  0.41
r21  =  0.461733997997
r31  =  0.305597529501
shapiro_w  =  0.922053277493
skewness  =  -0.507638774116
slope_per10  =  -0.274499994703
slope_per90  =  0.32849998679
stetson_k  =  0.777158197718
weighted_mean  =  14.8508902911
weighted_std  =  0.235111128128
