-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.148477376602
cusum  =  0.110766399099
eta  =  0.545343418952
hl_amp_ratio  =  0.5762382306
kurtosis  =  -1.17606978474
n_points  =  422
period  =  0.637273878524
period_SNR  =  56.1462168963
period_log10FAP  =  -65.8720576264
period_uncertainty  =  0.000130179879841
phase_cusum  =  0.253759510524
phase_eta  =  0.108008675685
phi21  =  1.18288768876
phi31  =  2.7876544675
quartile31  =  0.205
r21  =  0.39754275809
r31  =  0.190495815403
shapiro_w  =  0.939782679081
skewness  =  -0.303541473395
slope_per10  =  -0.223050022032
slope_per90  =  0.264922465995
stetson_k  =  0.835671008413
weighted_mean  =  14.3436307215
weighted_std  =  0.114591701252
