-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.320216695738
cusum  =  0.18244107417
eta  =  0.487366056455
hl_amp_ratio  =  0.419636143911
kurtosis  =  -1.11752150055
n_points  =  266
period  =  0.59897207822
period_SNR  =  34.1948616052
period_log10FAP  =  -34.4241009896
period_uncertainty  =  0.000161600461597
phase_cusum  =  0.261562689384
phase_eta  =  0.332399607682
phi21  =  -2.35539364181
phi31  =  -1.26058121505
quartile31  =  0.5275
r21  =  0.438444097569
r31  =  0.282037839942
shapiro_w  =  0.898627817631
skewness  =  -0.512658142991
slope_per10  =  -0.163633111556
slope_per90  =  0.316435216796
stetson_k  =  0.813072863129
weighted_mean  =  14.7531271225
weighted_std  =  0.295960994747
