-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.64


######### Lightcurve features #########

amplitude  =  0.0785028925413
cusum  =  0.25301519281
eta  =  0.54486474824
hl_amp_ratio  =  0.920640603846
kurtosis  =  0.899758717367
n_points  =  269
period  =  0.262362018065
period_SNR  =  14.6760472626
period_log10FAP  =  -9.84772099804
period_uncertainty  =  1.88067739533e-05
phase_cusum  =  0.146749273354
phase_eta  =  1.62402962295
phi21  =  0.0188180991035
phi31  =  -1.97513720231
quartile31  =  0.13
r21  =  0.1873074769
r31  =  0.0272767520898
shapiro_w  =  0.987359821796
skewness  =  -0.268565877173
slope_per10  =  -0.0509589521857
slope_per90  =  0.0492053126839
stetson_k  =  0.771231112542
weighted_mean  =  11.9910780669
weighted_std  =  0.107796230745
