-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.25884439356
cusum  =  0.124319357736
eta  =  0.563118818763
hl_amp_ratio  =  0.770602917497
kurtosis  =  -1.20512862385
n_points  =  359
period  =  0.685576281151
period_SNR  =  43.0010857221
period_log10FAP  =  -46.2503788999
period_uncertainty  =  0.000132248515748
phase_cusum  =  0.247712373573
phase_eta  =  0.289688986789
phi21  =  -1.79853129748
phi31  =  -0.691798016823
quartile31  =  0.405
r21  =  0.433981544792
r31  =  0.296060584154
shapiro_w  =  0.949278593063
skewness  =  -0.141916618413
slope_per10  =  -0.142298401395
slope_per90  =  0.35329999635
stetson_k  =  0.87082743884
weighted_mean  =  13.7565450536
weighted_std  =  0.23333002261
