-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.255810027476
cusum  =  0.119519545242
eta  =  0.698818841179
hl_amp_ratio  =  0.632077095809
kurtosis  =  -0.76185790493
n_points  =  321
period  =  0.721058674787
period_SNR  =  42.0738977608
period_log10FAP  =  -36.3456599428
period_uncertainty  =  0.000147383432202
phase_cusum  =  0.316077548266
phase_eta  =  0.311475366839
phi21  =  1.02356475196
phi31  =  2.0783083298
quartile31  =  0.33
r21  =  0.505826512491
r31  =  0.296036289921
shapiro_w  =  0.941328942776
skewness  =  -0.534328466971
slope_per10  =  -0.143121704219
slope_per90  =  0.26754741094
stetson_k  =  0.806799618967
weighted_mean  =  13.6943254072
weighted_std  =  0.216646935444
