-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.269865938112
cusum  =  0.154529159842
eta  =  0.599141111966
hl_amp_ratio  =  0.611535721953
kurtosis  =  -0.436576957226
n_points  =  130
period  =  0.641171523757
period_SNR  =  17.8701265094
period_log10FAP  =  -14.2994183393
period_uncertainty  =  0.000111013841369
phase_cusum  =  0.245812848721
phase_eta  =  0.213902694897
phi21  =  0.924294172169
phi31  =  1.79656385266
quartile31  =  0.345
r21  =  0.494213711145
r31  =  0.428121925228
shapiro_w  =  0.911763548851
skewness  =  -0.760979613467
slope_per10  =  -0.365885128122
slope_per90  =  0.549199995585
stetson_k  =  0.805691910636
weighted_mean  =  13.8456363636
weighted_std  =  0.230205267471
