-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.249830009324
cusum  =  0.174057532128
eta  =  0.485456089928
hl_amp_ratio  =  0.309924288293
kurtosis  =  -0.497229074545
n_points  =  277
period  =  0.714380837838
period_SNR  =  36.8948114223
period_log10FAP  =  -36.9454328734
period_uncertainty  =  0.000137922013939
phase_cusum  =  0.26669289088
phase_eta  =  0.119092925927
phi21  =  0.892837616645
phi31  =  2.05004606705
quartile31  =  0.31
r21  =  0.428097294052
r31  =  0.276906295441
shapiro_w  =  0.898289680481
skewness  =  -0.791638750941
slope_per10  =  -0.26664920007
slope_per90  =  0.485584864277
stetson_k  =  0.72951484865
weighted_mean  =  14.1159515219
weighted_std  =  0.204543370544
