-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.302678492168
cusum  =  0.115060172353
eta  =  0.618431360434
hl_amp_ratio  =  0.711418471265
kurtosis  =  -0.740447653981
n_points  =  293
period  =  0.584697837086
period_SNR  =  34.8247813437
period_log10FAP  =  -36.2809463971
period_uncertainty  =  0.000110934326739
phase_cusum  =  0.298402691057
phase_eta  =  0.0810876224839
phi21  =  -2.21389980932
phi31  =  -4.02692495452
quartile31  =  0.37
r21  =  0.494984892118
r31  =  0.308537138469
shapiro_w  =  0.951657176018
skewness  =  -0.485216429863
slope_per10  =  -0.22043984446
slope_per90  =  0.210129314801
stetson_k  =  0.82426014207
weighted_mean  =  15.5573858399
weighted_std  =  0.251956303557
