-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.130903516981
cusum  =  0.0832761218564
eta  =  0.835516362596
hl_amp_ratio  =  0.717529982077
kurtosis  =  -0.544431648741
n_points  =  327
period  =  0.659905525804
period_SNR  =  45.2678107094
period_log10FAP  =  -37.1155391222
period_uncertainty  =  0.000197399216623
phase_cusum  =  0.247205859379
phase_eta  =  0.56106889284
phi21  =  -2.02503834069
phi31  =  -0.29147325947
quartile31  =  0.18
r21  =  0.413924007452
r31  =  0.18177776393
shapiro_w  =  0.980718672276
skewness  =  -0.16775417836
slope_per10  =  -0.176387400808
slope_per90  =  0.186168151375
stetson_k  =  0.821340347665
weighted_mean  =  15.6873751485
weighted_std  =  0.112467552011
