-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.62


######### Lightcurve features #########

amplitude  =  0.195640931081
cusum  =  0.118664546719
eta  =  0.599364846945
hl_amp_ratio  =  1.34200638844
kurtosis  =  -0.355593426225
n_points  =  291
period  =  0.200460585429
period_SNR  =  27.6138274232
period_log10FAP  =  -26.2169705896
period_uncertainty  =  1.08664859383e-05
phase_cusum  =  0.222890547473
phase_eta  =  0.795070098845
phi21  =  -0.204139805992
phi31  =  1.23735796182
quartile31  =  0.265
r21  =  0.340505036226
r31  =  0.0571144135394
shapiro_w  =  0.984774529934
skewness  =  0.358395174744
slope_per10  =  -0.0294586479169
slope_per90  =  0.0242407527697
stetson_k  =  0.808788305103
weighted_mean  =  12.3871165997
weighted_std  =  0.185626414101
