-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.244198940924
cusum  =  0.142176185684
eta  =  0.573484016194
hl_amp_ratio  =  0.525147639944
kurtosis  =  -0.56422195417
n_points  =  360
period  =  0.677009842286
period_SNR  =  40.7715414765
period_log10FAP  =  -41.201747122
period_uncertainty  =  0.000128944435827
phase_cusum  =  0.232548202351
phase_eta  =  0.36906303685
phi21  =  1.03434450211
phi31  =  1.97446278982
quartile31  =  0.3625
r21  =  0.528185019685
r31  =  0.271335729409
shapiro_w  =  0.948390007019
skewness  =  -0.590761992526
slope_per10  =  -0.104062447109
slope_per90  =  0.303680455279
stetson_k  =  0.776803154151
weighted_mean  =  14.5419867262
weighted_std  =  0.247163365539
