-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.267496307706
cusum  =  0.128651472542
eta  =  0.543560685253
hl_amp_ratio  =  0.798002857976
kurtosis  =  -0.915002378262
n_points  =  312
period  =  0.704753472633
period_SNR  =  45.8919163837
period_log10FAP  =  -39.8135445244
period_uncertainty  =  0.000140793011753
phase_cusum  =  0.229078584709
phase_eta  =  0.247126432462
phi21  =  1.26975569326
phi31  =  2.64425100676
quartile31  =  0.365
r21  =  0.470398299432
r31  =  0.256664290014
shapiro_w  =  0.97213113308
skewness  =  -0.221421870184
slope_per10  =  -0.13277110756
slope_per90  =  0.190785340236
stetson_k  =  0.838190192777
weighted_mean  =  14.8577009972
weighted_std  =  0.239757974728
