-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.295811826326
cusum  =  0.174872857823
eta  =  0.492414697079
hl_amp_ratio  =  0.21868570162
kurtosis  =  -0.497666892438
n_points  =  383
period  =  0.619016058714
period_SNR  =  42.8016504343
period_log10FAP  =  -51.5213261359
period_uncertainty  =  0.000102792440236
phase_cusum  =  0.219765128858
phase_eta  =  0.225074998262
phi21  =  3.88117870257
phi31  =  4.68005569166
quartile31  =  0.41
r21  =  0.423427320014
r31  =  0.204539924961
shapiro_w  =  0.865124642849
skewness  =  -0.884472622607
slope_per10  =  -0.0962971724397
slope_per90  =  0.141580902262
stetson_k  =  0.692823785082
weighted_mean  =  14.8779658057
weighted_std  =  0.273659501151
