-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.248523591633
cusum  =  0.116767040172
eta  =  0.605255322919
hl_amp_ratio  =  0.874206702015
kurtosis  =  -0.997823442797
n_points  =  435
period  =  0.714668739476
period_SNR  =  48.8303906531
period_log10FAP  =  -55.4148094715
period_uncertainty  =  0.000171919360316
phase_cusum  =  0.248455449648
phase_eta  =  0.249141105773
phi21  =  1.21526474426
phi31  =  2.65208810486
quartile31  =  0.375
r21  =  0.513021666213
r31  =  0.373095335801
shapiro_w  =  0.968390703201
skewness  =  -0.0258094568286
slope_per10  =  -0.123999995179
slope_per90  =  0.196301455052
stetson_k  =  0.848553881202
weighted_mean  =  13.806090537
weighted_std  =  0.228997968827
