-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.26158623678
cusum  =  0.162103131391
eta  =  0.684631642119
hl_amp_ratio  =  0.424150269291
kurtosis  =  -1.04571459956
n_points  =  330
period  =  0.685063815514
period_SNR  =  46.3407615365
period_log10FAP  =  -40.1876517739
period_uncertainty  =  0.000132991116691
phase_cusum  =  0.276050614831
phase_eta  =  0.192919153727
phi21  =  1.27858824777
phi31  =  2.6343311906
quartile31  =  0.37
r21  =  0.48276729909
r31  =  0.321065812286
shapiro_w  =  0.93762499094
skewness  =  -0.385704700683
slope_per10  =  -0.130062242652
slope_per90  =  0.172167717059
stetson_k  =  0.773205646193
weighted_mean  =  16.0765935516
weighted_std  =  0.228236713735
