-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.293562500189
cusum  =  0.172702451693
eta  =  0.575300076306
hl_amp_ratio  =  0.51822317675
kurtosis  =  -0.166312755789
n_points  =  334
period  =  0.640155743005
period_SNR  =  34.4006338907
period_log10FAP  =  -35.1234998063
period_uncertainty  =  0.000110569946341
phase_cusum  =  0.217661769989
phase_eta  =  0.279392322529
phi21  =  -2.04439091231
phi31  =  -0.848291934616
quartile31  =  0.32
r21  =  0.551000265148
r31  =  0.30852043203
shapiro_w  =  0.943249821663
skewness  =  -0.639658249942
slope_per10  =  -0.168653576607
slope_per90  =  0.295685355351
stetson_k  =  0.73265733166
weighted_mean  =  14.5221670522
weighted_std  =  0.252558922702
