-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.231378258391
cusum  =  0.10800623762
eta  =  0.701448999431
hl_amp_ratio  =  0.615418203786
kurtosis  =  -0.979794444617
n_points  =  326
period  =  0.700463581296
period_SNR  =  43.3184435984
period_log10FAP  =  -35.3798017154
period_uncertainty  =  0.000139013973125
phase_cusum  =  0.260867090664
phase_eta  =  0.491483165287
phi21  =  0.913336640919
phi31  =  -0.963427909721
quartile31  =  0.34
r21  =  0.434332448289
r31  =  0.303962080661
shapiro_w  =  0.956299424171
skewness  =  -0.263791304073
slope_per10  =  -0.129009015322
slope_per90  =  0.222711988576
stetson_k  =  0.829277154103
weighted_mean  =  14.166878182
weighted_std  =  0.212330539584
