-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.191809258397
cusum  =  0.127695781414
eta  =  0.673318304086
hl_amp_ratio  =  0.528911890247
kurtosis  =  -0.759013940788
n_points  =  348
period  =  0.624475609601
period_SNR  =  56.4204300082
period_log10FAP  =  -49.9905383243
period_uncertainty  =  0.0001105423119
phase_cusum  =  0.242430475992
phase_eta  =  0.203872951702
phi21  =  1.11599388307
phi31  =  2.52562457342
quartile31  =  0.25
r21  =  0.33426455663
r31  =  0.187128556405
shapiro_w  =  0.935809850693
skewness  =  -0.567115250858
slope_per10  =  -0.162438190668
slope_per90  =  0.148722264657
stetson_k  =  0.803573700157
weighted_mean  =  15.1537491118
weighted_std  =  0.146802487632
