-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.357023598421
cusum  =  0.13647599024
eta  =  0.592904414433
hl_amp_ratio  =  0.209705448033
kurtosis  =  0.0676125291069
n_points  =  318
period  =  0.510239434028
period_SNR  =  46.6185744712
period_log10FAP  =  -42.3382781162
period_uncertainty  =  0.000118097317361
phase_cusum  =  0.274269443278
phase_eta  =  0.0673611454717
phi21  =  3.91643766107
phi31  =  4.68070983359
quartile31  =  0.36
r21  =  0.41500852868
r31  =  0.297449499809
shapiro_w  =  0.826133668423
skewness  =  -1.12914170545
slope_per10  =  -0.134511825924
slope_per90  =  0.192929517513
stetson_k  =  0.670911352758
weighted_mean  =  14.3854106643
weighted_std  =  0.293081888704
