-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.2973108136
cusum  =  0.0846624805171
eta  =  0.615185924074
hl_amp_ratio  =  0.475977056162
kurtosis  =  -0.258712916404
n_points  =  322
period  =  0.556377635515
period_SNR  =  41.8932247583
period_log10FAP  =  -36.2097834147
period_uncertainty  =  0.000105314717629
phase_cusum  =  0.258806985247
phase_eta  =  0.183271782297
phi21  =  -2.39243931506
phi31  =  -4.34932934287
quartile31  =  0.34
r21  =  0.551475365874
r31  =  0.336073288851
shapiro_w  =  0.932547271252
skewness  =  -0.767195665138
slope_per10  =  -0.111499600739
slope_per90  =  0.132218132165
stetson_k  =  0.745524421879
weighted_mean  =  15.4789769599
weighted_std  =  0.252173438727
