-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.311709845533
cusum  =  0.0976210514915
eta  =  0.620807968492
hl_amp_ratio  =  0.372574696503
kurtosis  =  0.364860786964
n_points  =  215
period  =  0.619864138207
period_SNR  =  24.3853350734
period_log10FAP  =  -24.3174514579
period_uncertainty  =  0.000123799513268
phase_cusum  =  0.224916860103
phase_eta  =  0.148758865162
phi21  =  4.08116224108
phi31  =  5.26170898127
quartile31  =  0.28
r21  =  0.447011947701
r31  =  0.289980505198
shapiro_w  =  0.893833577633
skewness  =  -1.02801013966
slope_per10  =  -0.169370374535
slope_per90  =  0.246000001207
stetson_k  =  0.700939783472
weighted_mean  =  14.683966523
weighted_std  =  0.193122074944
