-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.22857238108
cusum  =  0.166054917649
eta  =  0.797068955613
hl_amp_ratio  =  0.606343239538
kurtosis  =  -0.268672823262
n_points  =  291
period  =  0.614914679082
period_SNR  =  33.926142121
period_log10FAP  =  -32.7788994629
period_uncertainty  =  0.000122696648533
phase_cusum  =  0.321386718689
phase_eta  =  0.368347539811
phi21  =  0.759022440453
phi31  =  2.18192315182
quartile31  =  0.255
r21  =  0.452844812057
r31  =  0.279211108523
shapiro_w  =  0.966921746731
skewness  =  -0.543342181587
slope_per10  =  -0.083246184376
slope_per90  =  0.124911720158
stetson_k  =  0.778013288079
weighted_mean  =  17.5108945522
weighted_std  =  0.181631037687
