-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.285885599549
cusum  =  0.170539800432
eta  =  0.456892935019
hl_amp_ratio  =  0.439262541868
kurtosis  =  -1.05627094574
n_points  =  292
period  =  0.62918485096
period_SNR  =  37.5142618805
period_log10FAP  =  -40.4457099886
period_uncertainty  =  0.000107040637707
phase_cusum  =  0.257132444261
phase_eta  =  0.101468156908
phi21  =  0.855668225918
phi31  =  -1.21651559482
quartile31  =  0.4425
r21  =  0.465036693902
r31  =  0.222498285301
shapiro_w  =  0.905185520649
skewness  =  -0.537739302171
slope_per10  =  -0.226599988528
slope_per90  =  0.308385470423
stetson_k  =  0.801949446755
weighted_mean  =  15.3168344277
weighted_std  =  0.259292976333
