-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.289594602758
cusum  =  0.112560106415
eta  =  0.584836133687
hl_amp_ratio  =  0.662535475734
kurtosis  =  -0.863312494022
n_points  =  392
period  =  0.652656778326
period_SNR  =  45.8140193838
period_log10FAP  =  -47.7948061302
period_uncertainty  =  0.000120114988138
phase_cusum  =  0.229565326694
phase_eta  =  0.2462285639
phi21  =  -2.10144960026
phi31  =  -3.92650031114
quartile31  =  0.4225
r21  =  0.504042278093
r31  =  0.325295414105
shapiro_w  =  0.966743290424
skewness  =  -0.32703353883
slope_per10  =  -0.144487724054
slope_per90  =  0.237892107364
stetson_k  =  0.824619223399
weighted_mean  =  14.9477574372
weighted_std  =  0.260642096443
