-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.243597929228
cusum  =  0.209076036049
eta  =  0.483931209161
hl_amp_ratio  =  0.731551331098
kurtosis  =  -1.01147745943
n_points  =  345
period  =  0.724143480663
period_SNR  =  44.7787380929
period_log10FAP  =  -45.6433685035
period_uncertainty  =  0.000147076023508
phase_cusum  =  0.221564586898
phase_eta  =  0.151820530469
phi21  =  1.15368133749
phi31  =  -0.628132735703
quartile31  =  0.33
r21  =  0.51235148076
r31  =  0.307245080828
shapiro_w  =  0.955015301704
skewness  =  -0.310261401645
slope_per10  =  -0.205674037509
slope_per90  =  0.301232080296
stetson_k  =  0.842011954447
weighted_mean  =  14.2126613116
weighted_std  =  0.197264726652
