-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.280346618912
cusum  =  0.160476309552
eta  =  0.78428955588
hl_amp_ratio  =  0.468026700675
kurtosis  =  -0.275566689099
n_points  =  354
period  =  0.681047986245
period_SNR  =  39.6032098062
period_log10FAP  =  -36.3141886342
period_uncertainty  =  0.000125924119628
phase_cusum  =  0.220317593905
phase_eta  =  0.635824744718
phi21  =  -1.98532470666
phi31  =  -4.51657739374
quartile31  =  0.4
r21  =  0.480135845698
r31  =  0.298745947753
shapiro_w  =  0.963308513165
skewness  =  -0.547169005136
slope_per10  =  -0.0750027868897
slope_per90  =  0.0845188627534
stetson_k  =  0.734299941099
weighted_mean  =  18.0259051552
weighted_std  =  0.276530517358
