<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.265951014596
cusum  =  0.184609976148
eta  =  0.462455363493
hl_amp_ratio  =  0.486322695691
kurtosis  =  -0.199977114434
n_points  =  384
period  =  0.570591721374
period_SNR  =  39.3796723112
period_log10FAP  =  -45.7360437273
period_uncertainty  =  9.07487332573e-05
phase_cusum  =  0.19924756686
phase_eta  =  0.544211492707
phi21  =  0.818990112358
phi31  =  1.91228887943
quartile31  =  0.33
r21  =  0.363610652223
r31  =  0.0965497332916
shapiro_w  =  0.94061756134
skewness  =  -0.727091361137
slope_per10  =  -0.0799368970349
slope_per90  =  0.139878282797
stetson_k  =  0.772434731373
weighted_mean  =  15.0817673586
weighted_std  =  0.234494037348
</pre></body></html>