-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.223999299234
cusum  =  0.117370439342
eta  =  0.706231483343
hl_amp_ratio  =  0.55005849781
kurtosis  =  -0.639299743197
n_points  =  381
period  =  0.601953013892
period_SNR  =  45.1017317065
period_log10FAP  =  -44.3232184382
period_uncertainty  =  0.000100985275493
phase_cusum  =  0.212385783961
phase_eta  =  0.562977862442
phi21  =  0.887877816955
phi31  =  2.2324392297
quartile31  =  0.31
r21  =  0.447245175327
r31  =  0.223109083561
shapiro_w  =  0.968386769295
skewness  =  -0.369647418989
slope_per10  =  -0.0939498292612
slope_per90  =  0.127880001441
stetson_k  =  0.779980624132
weighted_mean  =  16.1154449141
weighted_std  =  0.197920023833
