-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.262411052545
cusum  =  0.0963180048666
eta  =  0.587552234
hl_amp_ratio  =  0.552133766884
kurtosis  =  -1.05112209897
n_points  =  307
period  =  0.645888483303
period_SNR  =  35.014907472
period_log10FAP  =  -37.697147816
period_uncertainty  =  0.000112799249426
phase_cusum  =  0.225432167165
phase_eta  =  0.452751447228
phi21  =  3.91679180483
phi31  =  4.86806774396
quartile31  =  0.39
r21  =  0.431507742794
r31  =  0.238569842223
shapiro_w  =  0.936566054821
skewness  =  -0.408618972906
slope_per10  =  -0.170516903001
slope_per90  =  0.285399998538
stetson_k  =  0.813367953173
weighted_mean  =  16.2006391338
weighted_std  =  0.236384566
