-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.298080419424
cusum  =  0.148104495166
eta  =  0.58621961459
hl_amp_ratio  =  0.66925919265
kurtosis  =  -0.832790533069
n_points  =  290
period  =  0.618866574068
period_SNR  =  30.9710400826
period_log10FAP  =  -32.0159112113
period_uncertainty  =  0.000124278719933
phase_cusum  =  0.221350919887
phase_eta  =  0.0994798109256
phi21  =  1.02652840741
phi31  =  2.50844773859
quartile31  =  0.4175
r21  =  0.599389988715
r31  =  0.393832342654
shapiro_w  =  0.951733291149
skewness  =  -0.36316661754
slope_per10  =  -0.229100149326
slope_per90  =  0.261394174117
stetson_k  =  0.83619731676
weighted_mean  =  15.3178011269
weighted_std  =  0.265776868706
