-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.260077746391
cusum  =  0.13197464489
eta  =  0.559730887757
hl_amp_ratio  =  0.408114168031
kurtosis  =  -1.03197120478
n_points  =  228
period  =  0.667768878302
period_SNR  =  27.0799123721
period_log10FAP  =  -27.2932707527
period_uncertainty  =  0.000120492403316
phase_cusum  =  0.319685811435
phase_eta  =  0.102681874875
phi21  =  -2.26807522435
phi31  =  -4.33411739243
quartile31  =  0.37
r21  =  0.42026082894
r31  =  0.418222729301
shapiro_w  =  0.898607909679
skewness  =  -0.546447118305
slope_per10  =  -0.230800015852
slope_per90  =  0.467796404263
stetson_k  =  0.821531384709
weighted_mean  =  14.9270590087
weighted_std  =  0.228996625358
